ALTER TABLE `#__membersmanager_member` ENGINE = InnoDB;

ALTER TABLE `#__membersmanager_member` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__membersmanager_type` ENGINE = InnoDB;

ALTER TABLE `#__membersmanager_type` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
