ALTER TABLE `#__sermondistributor_sermon` ENGINE = InnoDB;

ALTER TABLE `#__sermondistributor_sermon` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
