ALTER TABLE `#__sermondistributor_external_source` ENGINE = InnoDB;

ALTER TABLE `#__sermondistributor_external_source` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
