ALTER TABLE `#__componentbuilder_joomla_component` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_joomla_component` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_admin_view` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_admin_view` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_custom_admin_view` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_custom_admin_view` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_site_view` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_site_view` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_template` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_template` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_layout` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_layout` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_dynamic_get` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_dynamic_get` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_custom_code` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_custom_code` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_library` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_library` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_snippet` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_snippet` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_validation_rule` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_validation_rule` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_field` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_field` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_fieldtype` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_fieldtype` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_language_translation` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_language_translation` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_language` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_language` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_server` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_server` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_help_document` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_help_document` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_admin_fields` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_admin_fields` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_admin_fields_conditions` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_admin_fields_conditions` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_admin_fields_relations` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_admin_fields_relations` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_admin_custom_tabs` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_admin_custom_tabs` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_admin_views` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_admin_views` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_site_views` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_site_views` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_custom_admin_views` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_custom_admin_views` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_updates` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_updates` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_mysql_tweaks` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_mysql_tweaks` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_custom_admin_menus` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_custom_admin_menus` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_config` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_config` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_dashboard` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_dashboard` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_component_files_folders` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_component_files_folders` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_snippet_type` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_snippet_type` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_library_config` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_library_config` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE `#__componentbuilder_library_files_folders_urls` ENGINE = InnoDB;

ALTER TABLE `#__componentbuilder_library_files_folders_urls` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
