ALTER TABLE `#__costbenefitprojection_currency` ENGINE = InnoDB;

ALTER TABLE `#__costbenefitprojection_currency` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
