ALTER TABLE `#__costbenefitprojection_health_data` ENGINE = InnoDB;

ALTER TABLE `#__costbenefitprojection_health_data` CONVERT TO CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
