CREATE TABLE IF NOT EXISTS `#__ehealth_portal_user_map` (
	`guid` VARCHAR(36) NOT NULL DEFAULT '',
	`id` int(11) NOT NULL DEFAULT 0,
	PRIMARY KEY (`guid`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;
