CREATE TABLE IF NOT EXISTS `#__ehealth_portal_payment` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`nonpay_reason` INT(11) NOT NULL DEFAULT 0,
	`patient` INT(11) NOT NULL DEFAULT 0,
	`payment_amount` VARCHAR(100) NOT NULL DEFAULT '',
	`payment_category` VARCHAR(255) NOT NULL DEFAULT '',
	`payment_type` INT(11) NOT NULL DEFAULT 0,
	`receipt_no` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_general_medical_check_up` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`bmi` FLOAT(7) NULL DEFAULT 0,
	`bp_diastolic_one` INT(7) NOT NULL DEFAULT 0,
	`bp_diastolic_two` INT(7) NOT NULL DEFAULT 0,
	`bp_systolic_one` INT(7) NOT NULL DEFAULT 0,
	`bp_systolic_two` INT(7) NOT NULL DEFAULT 0,
	`chronic_medication` TEXT NOT NULL,
	`complaint` MEDIUMTEXT NOT NULL,
	`diagnosis` INT(11) NOT NULL DEFAULT 0,
	`dispensing` TEXT NOT NULL,
	`height` FLOAT(7) NOT NULL DEFAULT 0,
	`investigations` MEDIUMTEXT NOT NULL,
	`notes` MEDIUMTEXT NOT NULL,
	`patient` INT(11) NOT NULL DEFAULT 0,
	`pulse` INT(7) NOT NULL DEFAULT 0,
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`temp_one` FLOAT(7) NOT NULL DEFAULT 0,
	`temp_two` FLOAT(7) NOT NULL DEFAULT 0,
	`weight` FLOAT(7) NOT NULL DEFAULT 0,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_antenatal_care` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`caesarean_sections` INT(7) NOT NULL DEFAULT 0,
	`foetal_engagement` INT(11) NOT NULL DEFAULT 0,
	`foetal_heart_rate` INT(7) NOT NULL DEFAULT 0,
	`foetal_lie` INT(11) NOT NULL DEFAULT 0,
	`foetal_movements` MEDIUMTEXT NOT NULL,
	`foetal_presentation` INT(11) NOT NULL DEFAULT 0,
	`last_menstrual_period` DATE NOT NULL DEFAULT '0000-00-00',
	`live_births` INT(7) NOT NULL DEFAULT 0,
	`miscarriages` INT(7) NOT NULL DEFAULT 0,
	`normal_births` INT(7) NOT NULL DEFAULT 0,
	`patient` INT(11) NOT NULL DEFAULT 0,
	`pregnancies_excl` INT(7) NOT NULL DEFAULT 0,
	`still_births` INT(7) NOT NULL DEFAULT 0,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_immunisation` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`administration_part` INT(11) NOT NULL DEFAULT 0,
	`immunisation` TEXT NOT NULL,
	`immunisation_up_to_date` VARCHAR(255) NOT NULL DEFAULT '',
	`immunisation_vaccine_type` INT(11) NOT NULL DEFAULT 0,
	`patient` INT(11) NOT NULL DEFAULT 0,
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_vmmc` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`are_you_circumcised` VARCHAR(255) NOT NULL DEFAULT '',
	`info_ben_vmcc` VARCHAR(255) NOT NULL DEFAULT '',
	`interested_in_vmmc` VARCHAR(255) NOT NULL DEFAULT '',
	`partner_circumcised` VARCHAR(255) NOT NULL DEFAULT '',
	`patient` INT(11) NOT NULL DEFAULT 0,
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`vmmc_gender` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_prostate_and_testicular_cancer` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`patient` INT(11) NOT NULL DEFAULT 0,
	`ptc_age` VARCHAR(255) NOT NULL DEFAULT '',
	`ptc_diet` VARCHAR(255) NOT NULL DEFAULT '',
	`ptc_fam_history` VARCHAR(255) NOT NULL DEFAULT '',
	`ptc_overweight` VARCHAR(255) NOT NULL DEFAULT '',
	`ptc_phy_activity` VARCHAR(255) NOT NULL DEFAULT '',
	`ptc_urinate` VARCHAR(255) NOT NULL DEFAULT '',
	`ptc_urine_freq` VARCHAR(255) NOT NULL DEFAULT '',
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`txt_ptc_age` MEDIUMTEXT NOT NULL,
	`txt_ptc_diet` MEDIUMTEXT NOT NULL,
	`txt_ptc_fam_history` MEDIUMTEXT NOT NULL,
	`txt_ptc_overweight` MEDIUMTEXT NOT NULL,
	`txt_ptc_phy_activity` MEDIUMTEXT NOT NULL,
	`txt_ptc_urinate` MEDIUMTEXT NOT NULL,
	`txt_ptc_urine_freq` MEDIUMTEXT NOT NULL,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_tuberculosis` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`blood_streaked_sputum` VARCHAR(255) NOT NULL DEFAULT '',
	`date_of_treatment` DATE NOT NULL DEFAULT '0000-00-00',
	`diagnosed_with_disease` VARCHAR(255) NOT NULL DEFAULT '',
	`pain_in_chest` VARCHAR(255) NOT NULL DEFAULT '',
	`patient` INT(11) NOT NULL DEFAULT 0,
	`persistent_cough` VARCHAR(255) NOT NULL DEFAULT '',
	`reason` MEDIUMTEXT NOT NULL,
	`recurring_night_sweats` VARCHAR(255) NOT NULL DEFAULT '',
	`referral` INT(11) NOT NULL DEFAULT 0,
	`referred_second_sputum` VARCHAR(255) NOT NULL DEFAULT '',
	`shortness_of_breath` VARCHAR(255) NOT NULL DEFAULT '',
	`sputum_collection_one` VARCHAR(255) NOT NULL DEFAULT '',
	`sputum_result_one` VARCHAR(255) NOT NULL DEFAULT '',
	`sputum_result_two` VARCHAR(255) NOT NULL DEFAULT '',
	`tb_exposed` VARCHAR(255) NOT NULL DEFAULT '',
	`tb_fever` VARCHAR(255) NOT NULL DEFAULT '',
	`tb_reason_one` VARCHAR(255) NOT NULL DEFAULT '',
	`tb_reason_two` VARCHAR(255) NOT NULL DEFAULT '',
	`tb_treatment` VARCHAR(255) NOT NULL DEFAULT '',
	`treating_dhc` VARCHAR(255) NOT NULL DEFAULT '',
	`unusual_tiredness` VARCHAR(255) NOT NULL DEFAULT '',
	`weight_loss_wdieting` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_hiv_counseling_and_testing` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`counseling_type` VARCHAR(255) NOT NULL DEFAULT '',
	`eqa` VARCHAR(255) NOT NULL DEFAULT '',
	`final_test_result` VARCHAR(255) NOT NULL DEFAULT '',
	`last_test_date` VARCHAR(255) NOT NULL DEFAULT '',
	`patient` INT(11) NOT NULL DEFAULT 0,
	`prev_test_result` VARCHAR(255) NOT NULL DEFAULT '',
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`test_result_one` VARCHAR(255) NOT NULL DEFAULT '',
	`test_result_two` VARCHAR(255) NOT NULL DEFAULT '',
	`testing_reason` INT(11) NOT NULL DEFAULT 0,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_family_planning` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`diagnosis` INT(11) NOT NULL DEFAULT 0,
	`patient` INT(11) NOT NULL DEFAULT 0,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_health_education` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`education_type` VARCHAR(100) NOT NULL DEFAULT '',
	`health_education_topic` INT(11) NOT NULL DEFAULT 0,
	`patient` INT(11) NOT NULL DEFAULT 0,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_cervical_cancer` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`cc_periods` VARCHAR(255) NOT NULL DEFAULT '',
	`cc_reason` VARCHAR(255) NOT NULL DEFAULT '',
	`cc_result` VARCHAR(255) NOT NULL DEFAULT '',
	`cc_sex_actve` VARCHAR(255) NOT NULL DEFAULT '',
	`cc_sex_partner` VARCHAR(255) NOT NULL DEFAULT '',
	`cc_smoking` VARCHAR(255) NOT NULL DEFAULT '',
	`cc_v_discharge` VARCHAR(255) NOT NULL DEFAULT '',
	`cc_viginal_bleeding` VARCHAR(255) NOT NULL DEFAULT '',
	`pap_smear_collection` VARCHAR(255) NOT NULL DEFAULT '',
	`patient` INT(11) NOT NULL DEFAULT 0,
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`txt_cc_periods` MEDIUMTEXT NOT NULL,
	`txt_cc_sex_actve` MEDIUMTEXT NOT NULL,
	`txt_cc_sex_partner` MEDIUMTEXT NOT NULL,
	`txt_cc_smoking` MEDIUMTEXT NOT NULL,
	`txt_cc_v_discharge` MEDIUMTEXT NOT NULL,
	`txt_cc_viginal_bleeding` MEDIUMTEXT NOT NULL,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_breast_cancer` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`bc_abnormal_skin` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_age_range` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_breast_shape` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_breastfeeding` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_dimpling` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_family_history` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_history_hrt` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_inward_nipple` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_lump_near_breast` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_nipple_discharge` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_overweight` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_preg_age` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_preg_freq` INT(7) NOT NULL DEFAULT 0,
	`bc_race` VARCHAR(255) NOT NULL DEFAULT '',
	`bc_reg_exercise` VARCHAR(255) NOT NULL DEFAULT '',
	`patient` INT(11) NOT NULL DEFAULT 0,
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`txt_bc_abnormal_skin` MEDIUMTEXT NOT NULL,
	`txt_bc_breast_shape` MEDIUMTEXT NOT NULL,
	`txt_bc_dimpling` MEDIUMTEXT NOT NULL,
	`txt_bc_inward_nipple` MEDIUMTEXT NOT NULL,
	`txt_bc_lump_near_breast` MEDIUMTEXT NOT NULL,
	`txt_bc_nipple_discharge` MEDIUMTEXT NOT NULL,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_test` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`cholesterol_reading` INT(7) NOT NULL DEFAULT 0,
	`glucose_first_reading` INT(7) NOT NULL DEFAULT 0,
	`glucose_second_reading` INT(7) NOT NULL DEFAULT 0,
	`haemoglobin_reading` INT(7) NOT NULL DEFAULT 0,
	`hepatitis_first_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`hepatitis_second_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`malaria_first_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`malaria_second_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`patient` INT(11) NOT NULL DEFAULT 0,
	`pregnancy_first_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`pregnancy_second_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`reason` MEDIUMTEXT NOT NULL,
	`referral` INT(11) NOT NULL DEFAULT 0,
	`syphilis_first_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`syphilis_second_reading` VARCHAR(255) NOT NULL DEFAULT '',
	`urine_test_result` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_immunisation_vaccine_type` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`administration_part` INT(11) NOT NULL DEFAULT 0,
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_foetal_presentation` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_foetal_lie` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_counseling_type` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_foetal_engagement` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_health_education_topic` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_testing_reason` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_clinic` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`clinic_name` VARCHAR(255) NOT NULL DEFAULT '',
	`clinic_type` VARCHAR(255) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_clinic_name` (`clinic_name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_immunisation_type` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_unit` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_referral` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_planning_type` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_diagnosis_type` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_nonpay_reason` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_medication` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_payment_amount` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_administration_part` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_payment_type` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_strength` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`name` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_name` (`name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;

CREATE TABLE IF NOT EXISTS `#__ehealth_portal_site` (
	`id` INT(11) NOT NULL AUTO_INCREMENT,
	`asset_id` INT(10) unsigned NOT NULL DEFAULT 0 COMMENT 'FK to the #__assets table.',
	`alias` CHAR(64) NOT NULL DEFAULT '',
	`description` TEXT NOT NULL,
	`site_name` VARCHAR(255) NOT NULL DEFAULT '',
	`site_region` VARCHAR(255) NOT NULL DEFAULT '',
	`params` text NOT NULL,
	`published` TINYINT(3) NOT NULL DEFAULT 1,
	`created_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`modified_by` INT(10) unsigned NOT NULL DEFAULT 0,
	`created` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`modified` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`checked_out` int(11) unsigned NOT NULL DEFAULT 0,
	`checked_out_time` DATETIME NOT NULL DEFAULT '0000-00-00 00:00:00',
	`version` INT(10) unsigned NOT NULL DEFAULT 1,
	`hits` INT(10) unsigned NOT NULL DEFAULT 0,
	`access` INT(10) unsigned NOT NULL DEFAULT 0,
	`ordering` INT(11) NOT NULL DEFAULT 0,
	PRIMARY KEY  (`id`),
	KEY `idx_site_name` (`site_name`),
	KEY `idx_alias` (`alias`),
	KEY `idx_access` (`access`),
	KEY `idx_checkout` (`checked_out`),
	KEY `idx_createdby` (`created_by`),
	KEY `idx_modifiedby` (`modified_by`),
	KEY `idx_state` (`published`)
) ENGINE=InnoDB AUTO_INCREMENT=0 DEFAULT CHARSET=utf8mb4 DEFAULT COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC;


