drop table if exists gh_ost_test;
create table gh_ost_test (
  id bigint(20) NOT NULL AUTO_INCREMENT,
  column1 int(11) NOT NULL,
  column2 smallint(5) unsigned NOT NULL,
  column3 mediumint(8) unsigned NOT NULL,
  column4 tinyint(3) unsigned NOT NULL,
  column6 int(11) NOT NULL,
  PRIMARY KEY (id),
  UNIQUE KEY c12_uix (column1, column2)
) auto_increment=1;

drop event if exists gh_ost_test;
delimiter ;;
create event gh_ost_test
  on schedule every 1 second
  starts current_timestamp
  ends current_timestamp + interval 60 second
  on completion not preserve
  enable
  do
begin
  -- mediumint maxvalue: 16777215 (unsigned), 8388607 (signed)
  insert into gh_ost_test values (NULL, 13382498, 536,  8388607, 3, 1483892218);
  insert into gh_ost_test values (NULL, 13382498, 536, 10000000, 3, 1483892218);
end ;;
